X-Git-Url: https://git.saurik.com/apple/mdnsresponder.git/blobdiff_plain/619ee211a2d1cd19533acb8c109cb34a602cbd46..8ec81f6c99056f5c63e0045ca48a7c405058254b:/mDNSWindows/ControlPanel/ControlPanel.def

diff --git a/mDNSWindows/ControlPanel/ControlPanel.def b/mDNSWindows/ControlPanel/ControlPanel.def
index efb5c3b..3cb05eb 100644
--- a/mDNSWindows/ControlPanel/ControlPanel.def
+++ b/mDNSWindows/ControlPanel/ControlPanel.def
@@ -13,18 +13,6 @@
 ; WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
 ; See the License for the specific language governing permissions and
 ; limitations under the License.
-;
-;  Change History (most recent first):
-;
-;  $Log: ControlPanel.def,v $
-;  Revision 1.4  2006/08/14 23:25:28  cheshire
-;  Re-licensed mDNSResponder daemon source code under Apache License, Version 2.0
-;
-;  Revision 1.3  2005/03/03 19:55:22  shersche
-;  <rdar://problem/4034481> ControlPanel source code isn't saving CVS log info
-;
-;
-;
     
 LIBRARY	"Bonjour"
 
